= How to use JULI for TomEE in WTP?
:index-group: Unrevised
:jbake-date: 2018-12-05
:jbake-type: page
:jbake-status: published


It seems that WTP doesn't manage correctly Tomcat logging configuration
(which needs to be done through system properties). A quick workaround
is to add these properties manually:

[source,properties]
----
-Djava.util.logging.config.file="<tomee>/conf/logging.properties"
-Djava.util.logging.manager=org.apache.juli.ClassLoaderLogManager
----

More information on:
http://wiki.eclipse.org/WTP_Tomcat_FAQ#How_do_I_enable_the_JULI_logging_in_a_Tomcat_5.5_Server_instance.3F
