= DataSource Creator
:index-group: Datasource
:jbake-date: 2018-12-05
:jbake-type: page
:jbake-status: published

TomEE uses  `creator` to create the connection pool factory. In other
terms it means you can use any pool you want for DataSource in TomEE.

Default provided pools are DBCP (default in embedded mode) and Tomcat
JDBC (default in TomEE to be aligned on Tomcat).

Depending which one you use the accept configuration are not 100% the
same even if we try to align the most common entries to the historical
configuration (ie DBCP).

Here are a more detailled list of accepted properties by creator.

== DBCP2 (TomEE 7.x and 8.x)

Note: details are at
http://tomee.apache.org/containers-and-resources.html (note:
http://commons.apache.org/proper/commons-dbcp/configuration.html uses
the latest version of DBCP but TomEE 1.7.x is not using this version).

* AccessToUnderlyingConnectionAllowed
* ConnectionInitSqls
* ConnectionProperties
* DefaultAutoCommit
* DefaultCatalog
* DefaultReadOnly
* DefaultTransactionIsolation
* Delegate
* InitialSize
* JdbcDriver
* JdbcUrl
* LogAbandoned
* LogWriter
* LoginTimeout
* MaxActive
* MaxIdle
* MaxOpenPreparedStatements
* MaxWait
* MinEvictableIdleTimeMillis
* MinIdle
* Name
* NumTestsPerEvictionRun
* Password
* PasswordCipher
* PoolPreparedStatements
* RemoveAbandoned
* RemoveAbandonedTimeout
* TestOnBorrow
* TestOnReturn
* TestWhileIdle
* TimeBetweenEvictionRunsMillis
* UserName
* ValidationQuery
* ValidationQueryTimeout

== Tomcat JDBC

Note: details are at
https://tomcat.apache.org/tomcat-7.0-doc/jdbc-pool.html

* AbandonWhenPercentageFull
* AccessToUnderlyingConnectionAllowed
* AlternateUsernameAllowed
* CommitOnReturn
* ConnectionProperties
* DataSource
* DataSourceJNDI
* DbProperties
* DefaultAutoCommit
* DefaultCatalog
* DefaultReadOnly
* DefaultTransactionIsolation
* DriverClassName
* FairQueue
* IgnoreExceptionOnPreLoad
* InitSQL
* InitialSize
* JdbcInterceptors
* JmxEnabled
* LogAbandoned
* LogValidationErrors
* LogWriter
* LoginTimeout
* MaxActive
* MaxAge
* MaxIdle
* MaxWait
* MinEvictableIdleTimeMillis
* MinIdle
* Name
* NumTestsPerEvictionRun
* Password
* PasswordCipher
* PoolProperties
* PropagateInterruptState
* RemoveAbandoned
* RemoveAbandonedTimeout
* RollbackOnReturn
* SuspectTimeout
* TestOnBorrow
* TestOnConnect
* TestOnReturn
* TestWhileIdle
* TimeBetweenEvictionRunsMillis
* Url
* UseDisposableConnectionFacade
* UseEquals
* UseLock
* Username
* ValidationInterval
* ValidationQuery
* ValidationQueryTimeout
* Validator
* ValidatorClassName

== DBCP2 (TomEE 7.x)

Note: details are at
http://commons.apache.org/proper/commons-dbcp/configuration.html

* AccessToUnderlyingConnectionAllowed
* ConnectionInitSqls
* ConnectionProperties
* DefaultAutoCommit
* DefaultCatalog
* DefaultReadOnly
* DefaultTransactionIsolation
* Delegate
* InitialSize
* JdbcDriver
* JdbcUrl
* LogAbandoned
* LogWriter
* LoginTimeout
* MaxTotal
* MaxIdle
* MaxOpenPreparedStatements
* MaxWait
* MinEvictableIdleTimeMillis
* MinIdle
* Name
* NumTestsPerEvictionRun
* Password
* PasswordCipher
* PoolPreparedStatements
* RemoveAbandonedOnBorrow
* RemoveAbandonedOnMaintenance
* RemoveAbandonedTimeout
* TestOnBorrow
* TestOnReturn
* TestWhileIdle
* TimeBetweenEvictionRunsMillis
* UserName
* ValidationQuery
* ValidationQueryTimeout
