:index-group: Unrevised
:jbake-date: 2018-12-05
:jbake-type: page
:jbake-status: published


NOTE: Licensed to the Apache Software Foundation (ASF) under one or more
contributor license agreements. See the NOTICE file distributed with
this work for additional information regarding copyright ownership. The
ASF licenses this file to you under the Apache License, Version 2.0 (the
"License"); you may not use this file except in compliance with the
License. You may obtain a copy of the License at .
http://www.apache.org/licenses/LICENSE-2.0 . Unless required by
applicable law or agreed to in writing, software distributed under the
License is distributed on an "AS IS" BASIS, WITHOUT WARRANTIES OR
CONDITIONS OF ANY KIND, either express or implied. See the License for
the specific language governing permissions and limitations under the
License.

Logging in TomEE is configured using the conf/logging.properties file.
Here are some of the benefits:

You do not have to author a logging.properties from scratch.

You get one with sensible defaults.

If you did modify the default file, and you wanted to revert back to the
default file generated by TomEE, all you have to do is

Delete or rename the file e.g. rename it to logging.properties.BAK .

Restart the server
