// 
//     Licensed to the Apache Software Foundation (ASF) under one
//     or more contributor license agreements.  See the NOTICE file
//     distributed with this work for additional information
//     regarding copyright ownership.  The ASF licenses this file
//     to you under the Apache License, Version 2.0 (the
//     "License"); you may not use this file except in compliance
//     with the License.  You may obtain a copy of the License at
// 
//       http://www.apache.org/licenses/LICENSE-2.0
// 
//     Unless required by applicable law or agreed to in writing,
//     software distributed under the License is distributed on an
//     "AS IS" BASIS, WITHOUT WARRANTIES OR CONDITIONS OF ANY
//     KIND, either express or implied.  See the License for the
//     specific language governing permissions and limitations
//     under the License.
//

= Support for PHP on Continuous Build Servers
:jbake-type: tutorial
:jbake-tags: tutorials 
:jbake-status: published
:icons: font
:syntax: true
:source-highlighter: pygments
:toc: left
:toc-title:
:description: Support for PHP on Continuous Build Servers - Apache NetBeans
:keywords: Apache NetBeans, Tutorials, Support for PHP on Continuous Build Servers

|===
|This screencast shows how to set up PHP applications on Hudson and Jenkins continuous build servers. It includes an overview of what continuous builds are and why they can be useful with PHP applications. The screencast also shows how to launch a build job for a PHP application and how to access the results.

Author: Jeff Rubinoff
Time: 9:21 
link:http://bits.netbeans.org/media/php-continuous-builds.flv[+Download+] [21.7 MB]

link:/about/contact_form.html?to=3&subject=Feedback:%20PHP%20Continuous%20Builds%20Screencast[+Send Feedback on This Tutorial+]
 |  
|===
