////
Licensed to the Apache Software Foundation (ASF) under one
or more contributor license agreements.  See the NOTICE file
distributed with this work for additional information
regarding copyright ownership.  The ASF licenses this file
to you under the Apache License, Version 2.0 (the
"License"); you may not use this file except in compliance
with the License.  You may obtain a copy of the License at
  http://www.apache.org/licenses/LICENSE-2.0
Unless required by applicable law or agreed to in writing,
software distributed under the License is distributed on an
"AS IS" BASIS, WITHOUT WARRANTIES OR CONDITIONS OF ANY
KIND, either express or implied.  See the License for the
specific language governing permissions and limitations
under the License.
////
:documentationPath: /plugins/actions/
:language: en_US
:page-alternativeEditUrl: https://github.com/apache/incubator-hop/edit/master/plugins/actions/checkdbconnection/src/main/doc/checkdbconnection.adoc
= Check Db connections

== Description

This workflow action allows you to verify connectivity with one or several databases.

== Options

[width="90%", options="header"]
|===
|Option|Description
|Workflow action name|The name of the workflow action. *Note*: This name has to be unique in a single workflow. A workflow action can be placed several times on the canvas, however it will be the same workflow action.
|Connection|List of connections.
|Wait|After the connection was opened, wait x (s, min, hrs).
|Units of Time|Specify the unit of measurement for the length of time to remain connected.
|Get connections|Get available connects. 
|===