SELECT 'Upgrading MetaStore schema from 1.1.0 to 1.2.0' AS ' ';
SOURCE 021-HIVE-7018.mysql.sql;
UPDATE VERSION SET SCHEMA_VERSION='1.2.0', VERSION_COMMENT='Hive release version 1.2.0' where VER_ID=1;
SELECT 'Finished upgrading MetaStore schema from 1.1.0 to 1.2.0' AS ' ';

