= SSL Properties

.SSL Properties
|===
|Name |Env Variable |Default Value |Description

|server.ssl.enabled
|FINERACT_SERVER_SSL_ENABLED
|true
|When set to true, SSL (Secure Sockets Layer) or TLS (Transport Layer Security) will be enabled for the server.

|server.ssl.protocol
|FINERACT_SERVER_SSL_PROTOCOL
|TLS
|This property allows you to define specific SSL/TLS protocol version the server will use when establishing secure connections. Common protocols include TLSv1.2, TLSv1.3, etc.

|server.ssl.ciphers
|FINERACT_SERVER_SSL_CIPHERS
|TLS_RSA_WITH_AES_128_CBC_SHA256
|This property allows you to control the cipher suites that fineract will accept for secure connections

|server.ssl.enabled-protocols
|FINERACT_SERVER_SSL_PROTOCOLS
|TLSv1.2
|This property allows you to define a list of SSL/TLS protocol versions that the server will support when establishing secure connections

|server.ssl.key-store
|FINERACT_SERVER_SSL_KEY_STORE
|classpath:keystore.jks
|The property is used to specify the location of the SSL key store file that contains the server's private key and the associated certificate

|server.ssl.key-store-password
|FINERACT_SERVER_SSL_KEY_STORE_PASSWORD
|openmf
|The property defines the password for the keystore specified under property **server.ssl.key-store**
|===
