= Tenant Database Properties

.Tenant Database Properties
|===
|Name |Env Variable |Default Value |Description

|fineract.tenant.host
|FINERACT_DEFAULT_TENANTDB_HOSTNAME
|localhost
|TBD

|fineract.tenant.port
|FINERACT_DEFAULT_TENANTDB_PORT
|3306
|TBD

|fineract.tenant.username
|FINERACT_DEFAULT_TENANTDB_UID
|root
|TBD

|fineract.tenant.password
|FINERACT_DEFAULT_TENANTDB_PWD
|mysql
|TBD

|fineract.tenant.parameters
|FINERACT_DEFAULT_TENANTDB_CONN_PARAMS
|
|TBD

|fineract.tenant.timezone
|FINERACT_DEFAULT_TENANTDB_TIMEZONE
|Asia/Kolkata
|TBD

|fineract.tenant.identifier
|FINERACT_DEFAULT_TENANTDB_IDENTIFIER
|default
|TBD

|fineract.tenant.name
|FINERACT_DEFAULT_TENANTDB_NAME
|fineract_default
|TBD

|fineract.tenant.description
|FINERACT_DEFAULT_TENANTDB_DESCRIPTION
|Default Demo Tenant
|TBD

|fineract.tenant.master-password
|FINERACT_DEFAULT_TENANTDB_MASTER_PASSWORD
|fineract
|TBD

|fineract.tenant.encryption
|FINERACT_DEFAULT_TENANTDB_ENCRYPTION
|AES/CBC/PKCS5Padding
|TBD

|spring.liquibase.enabled
|FINERACT_LIQUIBASE_ENABLED
|true
|TBD

|fineract.tenant.read-only-name
|FINERACT_DEFAULT_TENANTDB_RO_NAME
|
|

|fineract.tenant.read-only-host
|FINERACT_DEFAULT_TENANTDB_RO_HOSTNAME
|
|

|fineract.tenant.read-only-port
|FINERACT_DEFAULT_TENANTDB_RO_PORT
|
|

|fineract.tenant.read-only-username
|FINERACT_DEFAULT_TENANTDB_RO_UID
|
|

|fineract.tenant.read-only-password
|FINERACT_DEFAULT_TENANTDB_RO_PWD
|
|

|fineract.tenant.read-only-parameters
|FINERACT_DEFAULT_TENANTDB_RO_CONN_PARAMS
|
|

|===
