NOTE: For information on how to configure your installation, see
{cass_url}doc/latest/getting_started/configuring.html[Configuring
Cassandra].

[arabic, start=7]
. Check the status of Cassandra:

[source,shell]
----
include::example$BASH/nodetool_status_nobin.sh[]
----

The status column in the output should report `UN` which stands for
"Up/Normal".

Alternatively, connect to the database with:

[source,shell]
----
include::example$BASH/run_cqlsh_nobin.sh[]
----
