Title: TestResults

These are the test results for the current Aries release.

link:ct/1.0.0/org.osgi.test.cases.blueprint.html[Blueprint] - 7 failures

link:ct/1.0.0/org.osgi.test.cases.blueprint.secure.html[Blueprint Secure] - 0 failures

link:ct/1.0.0/org.osgi.test.cases.blueprint.java5.html[Blueprint Java 5] - 0 failures

link:ct/1.0.0/org.osgi.test.cases.jmx.html[JMX] - 18  failures

JPA - Not run

link:ct/1.0.0/org.osgi.test.cases.jndi.html[JNDI] - 7 failures

link:ct/1.0.0/org.osgi.test.cases.jndi.secure.html[JNDI Secure] - 0 failures

link:ct/1.0.0/org.osgi.test.cases.transaction.html[Transaction] - 0 failures
